<script lang="ts">
  //// import
  import { onMount } from "svelte";

  //// function
  onMount(() => {
    setTimeout(() => {
      window.location.href = "https://www.webb.page";
    }, 3000);
  });
</script>

<p>Redirecting in 3 seconds&hellip;</p>
