<script type="text/typescript">
  import Base from "../../component/IconBase.svelte";

  export const svgContent = `<path d="M20.633, 18.207c-0.145, 0.145 -0.391, 0.25 -0.827, 0.254c-0.719, 0.017 -1.787, -0.345 -3.03, -1.002l0.994, -6.354c1.997, 2.574 3.155, 4.982 3.125, 6.267c-0.004, 0.434 -0.11, 0.68 -0.262, 0.835m-13.807, -1.907c-1.669, -1.634 -2.604, -5.462 -2.588, -9.07c-0, -0.316 0.011, -0.628 0.024, -0.941c1.008, 2.176 2.884, 4.713 5.36, 7.216c2.501, 2.473 5.037, 4.348 7.214, 5.355c-0.311, 0.014 -0.625, 0.025 -0.941, 0.025c-3.609, 0.014 -7.439, -0.918 -9.069, -2.585m6.502, 5.322c0.02, 0.052 0.039, 0.103 0.057, 0.15l-9.877, -0c0.135, -0.363 0.331, -0.824 0.596, -1.316c0.555, -1.036 1.411, -2.136 2.572, -2.7c1.475, 1.089 3.532, 1.754 5.748, 2.087c0.407, 0.633 0.709, 1.278 0.904, 1.779m-7.576, -19.395c1.285, -0.031 3.695, 1.129 6.267, 3.126l-6.355, 0.997c-0.657, -1.245 -1.021, -2.315 -1.001, -3.034c-0, -0.108 0.008, -0.203 0.019, -0.289c0.002, -0.006 0.003, -0.013 0.004, -0.02c0.039, -0.249 0.124, -0.411 0.233, -0.516c0.154, -0.154 0.4, -0.262 0.833, -0.264m11.21, 2.351c0.225, -0.226 0.507, -0.333 0.795, -0.333c0.288, -0 0.571, 0.105 0.796, 0.328c0.219, 0.221 0.325, 0.503 0.325, 0.792c-0, 0.287 -0.106, 0.571 -0.33, 0.795c-0.217, 0.219 -0.501, 0.324 -0.791, 0.326c-0.288, -0.002 -0.572, -0.109 -0.789, -0.328c-0.223, -0.222 -0.33, -0.506 -0.332, -0.797c0.002, -0.287 0.107, -0.567 0.326, -0.783m-1.239, 1.938c0.103, 0.181 0.222, 0.355 0.376, 0.509c0.153, 0.155 0.327, 0.274 0.509, 0.375l-5.667, 5.668c-0.15, -0.146 -0.303, -0.281 -0.452, -0.431c-0.151, -0.151 -0.286, -0.303 -0.433, -0.455l5.667, -5.666Zm-2.004, 0.269l-4.51, 4.51c-1.171, -1.303 -2.142, -2.606 -2.889, -3.805l6.965, -1.094c0.145, 0.127 0.289, 0.256 0.434, 0.389m-1.888, 7.13l4.508, -4.509c0.131, 0.145 0.262, 0.289 0.388, 0.434l-1.092, 6.963c-1.199, -0.746 -2.503, -1.717 -3.804, -2.888m10.29, 3.457c-0.035, -2.043 -1.584, -4.903 -4.095, -7.899l0.287, -1.834c0.404, -0.098 0.791, -0.297 1.106, -0.612c0.456, -0.461 0.689, -1.064 0.687, -1.662c0.002, -0.599 -0.229, -1.201 -0.687, -1.658l-0.001, -0.002c-0.46, -0.458 -1.062, -0.689 -1.661, -0.689c-0.601, 0 -1.203, 0.233 -1.658, 0.691c-0.318, 0.311 -0.518, 0.699 -0.616, 1.103l-1.832, 0.287c-2.996, -2.512 -5.855, -4.063 -7.899, -4.097c-0.64, -0.002 -1.255, 0.175 -1.699, 0.622c-0.282, 0.277 -0.445, 0.63 -0.535, 1.01l-0.008, -0.002c-0.334, 1.385 -0.498, 2.975 -0.498, 4.6c0.015, 3.655 0.81, 7.478 2.716, 9.656c-2.795, 1.684 -3.622, 5.312 -3.658, 5.352l-0.191, 0.762l13.135, 0l-0.19, -0.762c-0.008, -0.03 -0.259, -1.027 -0.88, -2.218c0.65, 0.052 1.302, 0.089 1.951, 0.092c1.625, 0 3.212, -0.165 4.599, -0.496l-0.003, -0.013c0.378, -0.087 0.731, -0.25 1.012, -0.531c0.443, -0.449 0.622, -1.062 0.618, -1.7" style="fill: rgb(0, 0, 255);"/>`;
</script>

<Base {svgContent}/>
